
Purpose:

   This utility fulfills a need to determine the required build
   time for a programming project, or the time taken to compile
   and link a source module.

   The output may be redirected to a file for logging purposes.

   Both the start and end date and time are displayed.






Command-line usage: DELTIME  <options> <exename>

          exename = name of exe, com, bat, or cmd files
                    (eg. make, nmake, etc.)

Non-verbose usage:  DELTIME  <options>

   requires the file DELTIME.INI, where the first line would be
   the <exename> file name.

Options:

   -? or /help    = displays this help file



Support:

   Support is available only through compuserve or via internet mail
   at the following compuserve id: 73173.653@compuserve.com

   Support is limited to relevant bug fixes only. Request for new
   features will be incorporated in future releases of this product.

   If you would like to receive updates, via E-mail, on upcoming
   releases of this product or other products, please reply to
   above E-mail address.





Legal:

   This product is FREEWARE, therefore requires NO registration and
   may be freely distributed, however, intellectual property rights
   remain with the creator/originator. This program or it's
   contents may not be modified in anyway.

   AmeriSoft and it's affiliates will not liable for any damages
   incurred from the use of this program. If a defect is found
   in the code, AmeriSoft will make reasonable attempt to cure
   the problem. This program provided 'AS IS'.

